[Proxy]
HTTP_Proxy_Server=
FTP_Proxy_Server=
Gopher_Proxy_Server=
Secure_Proxy_Server=
Socks_Proxy_Server=
Use_Same_Proxy=0
Proxy_Override=<local>
Proxy_Enable=0

[Entry]
Entry_Name=Lynxnet

[Phone]
Phone_Number=08451232096
Area_Code=
Country_Code=44
Country_ID=44
Dial_As_Is=No

[User]
Requires_Logon=Yes
Name=lynxnet
Password=localrate
Display_Password=Yes

[Server]
SW_Compress=No
PW_Encrypt=No
Type=PPP
Network_Logon=no
SW_Encrypt=no
Negotiate_NetBEUI=no
Negotiate_IPX/SPX=no
Negotiate_TCP/IP=Yes

[TCP/IP]
Specify_Server_Address=No
IP_Header_Compress=No
Gateway_On_Remote=Yes
DNS_Address=
DNS_Alt_Address=

[ConnectionSettings]
ApplyInsToConnection=Lynxnet